‘Shocking’ New Set Photos Of Spider-Man Foe

Some new set photos of Spider-Man homecoming show off yet another villain for the upcoming movie set to release in 2017. The pictures come via Marvel News on Twitter and give the first glimpse of Herman Schultz AKA The Shocker, who is rumoured to be played by Bokeem Woodbine. You may know Bokeem as Mike Milligan from […]